-300 -200 -100 0 100 200 300 Relative Right Ascension in millidegrees

1995- 9- 9 10.36 - 10.45 UT 87 GHz RA 2.0%

300 200 100 0 -100 -200

-300

Relative Declination in millidegrees

Metsahovi

S

N

E

W

0.50 0.70 0.90 0.94 0.96 0.98 1.00 1.02 1.038 Max

-910 550