110B0440-003

Flux density [Jy]a)

B0511-220110b )

B0528-250 c)1

Flux density [Jy]

B0528+134d ) 110

1100.1110100B1127-145

Flux density [Jy]Frequency [GHz]e)

1101001000B1519-273Frequency [GHz]1f)