110B1349-439a)

Flux density [Jy]

B1954-388b ) 110

1B2128-123

Flux density [Jy]c)

B2136+141d ) 1

0.110.1110100B2254-204

Flux density [Jy]Frequency [GHz]e)

1101001000B2255-282Frequency [GHz]101f)