110B0048-097

Flux density [Jy]a)

B0332-403b ) 101

B0454-2341

Flux density [Jy]c)

B0537-441d ) 101

B1057-7970.110.1110100

Flux density [Jy]Frequency [GHz]e)

1101001000B1334-127Frequency [GHz]101f)