D0.20.40.60.80537-286 230 GHz

D

Flux density [Jy]

00.20.40.60.81986198819901992199419960537-286 90 GHz

DDate

Flux density [Jy]

10203040500537-286 EGRET

D

Flux [10

-8 phot cm

- 2

]