1100.11101000130-171

Flux density [Jy]a)

0.11101000506-612110b)

100521-365

Flux density [Jy]c)

0537-2860.11d)

0.110.11101000539-057Frequency [GHz]

Flux density [Jy]e)

0.11101000805-0770.11Frequency [GHz]f)