D0.511.521514-241 230 GHz

D

Flux density [Jy]

00.511.522.531984198619881990199219941996199820001514-241 90 GHz

D

Flux density [Jy]

1020304050601514-241 EGRET

D

Flux [10

-8 phot cm

- 2

]