D0.511.51127-145 230 GHz

D

Flux density [Jy]

00.511.522.519861988199019921994199619981127-145 90 GHz

DDate

Flux density [Jy]

10203040506070801127-145 EGRET

D

Flux [10

-8 phot cm

- 2

]