2468

S(230 GHz)

1.07

246810

S(90 GHz)

Flux012345619961996.519971997.519981998.51999

S(1.6GHz)

S(2.3GHz)

S(4.8GHz)

S(8.6GHz)

S(1.6)Date

Flux density [Jy]